\Hb{No.8}

\small
\noindent
\input{stabat_mater_text_17.tex}
\input{stabat_mater_text_18.tex}

\vspace{1ex}
%\def\betweenLilyPondSystem#1{\ifnum#1=6\newpage\noindent\else\\[5mm]\fi}
\LYIND%
\input{stabat_mater_08-systems}
%\renewcommand{\betweenLilyPondSystem}[1]{\\[5mm]}
